                                Pg. 1 of 7

DIRECTORY - Selects directory from which to view thumbnail image page.
COPY ────── Copies files(s) to floppy/hard drive - LMB selects/deselects
SLIDESHOW - Activates tag mode for SLIDESHOW - LMB selects/deselects
TAG ALL ──- Selects/deselects ALL thumbnails for SLIDESHOW or COPY
HIDE ────── Hides thumbnails with CD-ILLUSION LOGO or BLANK screen
F6 ──────── Reserved                         ┌──────────────────────────┐
DOS SHELL ─ Shells to DOS                    │ Mouse Button References  │
HELP ────── Activates HELP menu              │                          │
SETUP ───── Activates SETUP menu             │ LMB = Left Mouse Button  │
ESC ─────── Quits CD-ILLUSION                │ RMB = Right Mouse Button │
                                             └──────────────────────────┘
     F1     F2     F3     F4     F5     F6     F7     F8     F9    ESC
  ┌──────┬──────┬──────┬──────┬──────┬──────┬──────┬──────┬──────┬──────┐
  │ DIR  │ COPY │ SLIDE│ TAG  │ HIDE │      │ DOS  │ HELP │ SETUP│ QUIT │
  └──────┴──────┴──────┴──────┴──────┴──────┴──────┴──────┴──────┴──────┘
                                Pg. 2 of 7

DIRECTORY ─ Selects directory from which to view thumbnail image page.

COPY ────── This option is used to copy images from the CD-ROM disc to
            a floppy or hard drive, (copies from current directory only).
            To copy images CLICK the LMB on the COPY button on MENU BAR,
            TAG MODE will appear on the status line. Use the mouse to
            move the RED BOX over the image you want to copy and CLICK
            the LMB. This will tag the image with a WHITE BOX and update
            the TAG MODE status indicator to show the number of tagged
            images. Once you have all the images tagged on a thumbnail
            page that you want to copy CLICK the LMB on the COPY button a
            second time. A copy utility window will open prompting you
            for the PATH to copy the files to and will automatically
            create the directory if it does not exist.

                                Pg. 3 of 7

SLIDESHOW ─ This option is used to slideshow multiple images from the
            disc for viewing. CLICK the LMB on the SLIDESHOW button on
            MENU BAR - TAG MODE will appear on the status line. Use the
            mouse to move the RED BOX over the image you want to add to a
            slideshow and CLICK the LMB. This will tag the image with a
            WHITE BOX and update the TAG MODE status indicator to show
            the number of tagged images. Once you have all the images
            tagged that you want to slideshow on a thumbnail page you can
            either select another DIRECTORY and tag additional images or
            start the slideshow by CLICKING the LMB on the SLIDESHOW
            button a second time. Delay between images is user definable
            in the CD-ILLUSION SETUP. (default is 2 seconds)



                                Pg. 4 of 7

TAG ─────── This option is used to TAG ALL images on a thumbnail page for
            the COPY and SLIDESHOW options. CLICKING the LMB once on the
            TAG ALL button on MENU BAR will tag ALL images on thumbnail
            page and update the TAG MODE status indicator. CLICKING the
            LMB a second time will untag ALL images on thumbnail page.
            You can selectively untag images from a thumbnail page that
            ALL the images are tagged on by using the mouse to move the
            RED BOX over the image that you want to untag and CLICKING
            the LMB. This will update the TAG MODE status indicator and
            eliminate that image from the slideshow.





                                Pg. 5 of 7

HIDE ────── This option is used to HIDE the current thumbnail page being
            displayed. CLICKING the LMB on the HIDE button on the MENU
            BAR while a thumbnail page is displayed on the screen, will
            HIDE the thumbnail page with either a BLANK screen or the
            CD-ILLUSION LOGO screen. Pressing any key or CLICKING any
            mouse button will restore the thumbnail page. This setting is
            user definable in the CD-ILLUSION SETUP.
            (default CD-ILLUSION LOGO)

DOS SHELL ─ This option allows you to SHELL to DOS from the CD-ILLUSION
            interface & get all your conventional memory back less 17K.
            (Ie. at boot 617K conventional shelled 600K conventional)
            CLICK LMB on DOS SHELL button on MENU BAR to activate.


                                Pg. 6 of 7

HELP ────── This option displays a graphical quick reference help screen
            for keyboard and mouse navigation commands. It also includes
            graphical information screens for: ABOUT CD-ILLUSION,
            CREDITS (Who's Who),  and NOTICES (Copyrights and TradeMarks)
            CLICK LMB on HELP button on MENU BAR to activate.

SETUP ───── This option runs CD-ILLUSION SETUP
            CLICK LMB on SETUP button on MENU BAR to activate.

ESC ─────── Quits and Exits CD-ILLUSION
            CLICK LMB on QUIT MENU button on MENU BAR or CLICK RMB to
            quit and exit.



                                Pg. 7 of 7

─ VIEWING IMAGES ─

Use the mouse to move the RED BOX over an image, CLICK the LMB. The image
will then be displayed in FULL SCREEN mode. To return back to the
thumbnail page press any key or CLICK any mouse button.
